
 Plotting parameters are entered in a freeform manner by way of keywords and
 optional value assignments of the form KEY=value.  Key-value pairs may be
 given in any order separated by spaces or commas.  The following keys are
 recognized by PWS16PC:
 
 KEYWORD  DEFAULT VALUE   EXAMPLE        COMMENT
 spacecraft      (none)   spacecraft=1   Voyager 1 or 2
 year            (none)   year=79        SCET year
 day             (none)   day=64         SCET day of year
 hour                00   hour=14        SCET hour of day
 minute              00   minute=30      SCET minute of hour
 span                24   span=4         plot length in hours
 units                5   units=6        data units:
                                         (1) uncalibrated
                                         (2) LOG calibrated volts (V)
                                         (3) LOG RMS volts (Vrms)
                                         (4) LOG electric field (V/M)
                                         (5) LOG RMS electric field (Vrms/M)
                                         (6) LOG spectral density (V^2/M^2/Hz)
                                         (7) LOG power flux (W/M^2/Hz)

 Press ENTER to continue ...
#CONTINUE

 KEYWORD  DEFAULT VALUE   EXAMPLE        COMMENT
 nopeaks              N   nopeaks        supress plotting of peaks
 min   (unit dependent)   min=-7         minimum data to be plotted
 max   (unit dependent)   maz=-1         maximum data to be plotted
 cmin                 1   cmin=5         lowest channel to be plotted
 cmax                16   cmax=8         highest channel to be plotted
 c1                   1   c1=5           first channel to be plotted
 c2                   2   c2=7           second channel to be plotted
  .                   .   .              .
  .                   .   .              .
  .                   .   .              .
 c16                 16   c16=1          sixteenth channel to be plotted
 -                    N   -              command continued on next line
 end                  N   end            end processing and exit








 Press ENTER to continue ...
#CONTINUE
 
 NOTE: keywords must not be abbreviated.  An entry like "KEY" is equivalent to
 "KEY=Y" or "KEY=1".  Key values may be integer or floating point or the
 letters Y, N, T or F.  Default values are set to the previous entries.
 
 The keywords CMIN and CMAX may be used to specify the range of channels to be
 plotted or if for example two non-adjacent channels needed to be plotted,
 then the keywords C1 and C2 could be used.
 
 EXAMPLE:
 > spacecraft=1 year=79 day=64 span=3.5 cmin=7 cmax=9
 
 The above would plot Voyager 1 data from 79 064 0000 - 0330, channels 7-9,
 (311, 562, 1000 Hz) in default RMS electric field units.


 ADDITIONAL FEATURES:

 KEYWORD  DEFALUT VALUE   EXAMPLE        COMMENT
 SNAPSHOT             N   snapshot=on    Snap Shot of averages and/or peaks
 GRAY                 N   gray=off       Plot intensity in shades of gray 
 COLOR                N   color=on       Plot intensity in sixteen colors
 SHELL                    shell          shell to DOS
 RUN                      run            run a program
 INPUT                    input=server   change input method
