Cassini MAG, Imperial College - data on 16 Apr 1998 - plotted on 02-10-2018

i n p u t : 9 8 1 0 6 _ m r d c d _ h k v h m n _ r t n _ 1 m

     - 1 0 0

       - 5 0

          0

         5 0

       1 0 0

       1 5 0

R T N
T

         i n p u t : 9 8 1 0 6 _ m r d c d _ h k f g m n _ r t n _ 1 m

     - 1 0 0

       - 5 0

          0

         5 0

       1 0 0

R T N
T

     - 1 0 0

       - 5 0

          0

         5 0

       1 0 0

R T N
T

        2 3 : 0 0
        9 8 1 0 5 A P R 1 5

                             0 3 : 0 0 0 7 : 0 0 1 1 : 0 0 1 5 : 0 0 1 9 : 0 0 2 3 : 0 0
                                                                T I M E _ T A I ( T I C = 1 H R )

          0

         5 0

       1 0 0

       1 5 0

       2 0 0

O T A L
n T